00.20.40.60.8105101520253035404550FitnessGeneration00.20.40.60.8105101520253035404550FitnessGeneration 0.060.080.100.120.01000.01250.01500.01750.0200NGOSMutation Probability0.060.080.100.120.500.550.600.650.700.750.800.850.900.95NGOSCrossover Probability

0.060.080.100.120.141.61.82.02.22.42.62.83.0NGOSFitness Scaling Factor

Link Capacity &Availability TableLink NumberCapacityAvail.0123456723101263195220.980.980.980.980.980.980.980.98Table 1FromTo012345.568.331.670.834.179.721.670.286.945.569.030.561.391.110.560.560123410.423.475.561.11Busy-Hour Traffic MatrixTable 4Figure 6 1203415420736A Small Circuit-SwitchedCommunications NetworkLinks marked withlink numberFromTo012340456147-1257-136-1-1012340123Network Configuration TableTable 3FromTo001234(0,2,4,3)(0,1,3)(0,2,1)(0,1)Routing TableTable 2(1,4,2,3)(1,3,0)(1,2,0)(1,0)(2,1,3,4)(2,3,0)(2,1,0)(1,0)(3,2,1,4)(3,2,0)(3,1,0)(1,0)(4,1,2)(4,0)(1,0)(2,0,1)1234