SEX LIFE OF AN ELECTRONOne night when his charge was pretty high, Micro-Farad decided to seek out acute coil to help him discharge. He picked up Milli-Amp and took her for aride on his Megacycle. Then he rode across the Wheatstone Bridge, around theSine Wave, and stopped in the Magnetic Field by the flowing stream.Micro-Farad, attracted by Milli-Amp’s characteristic curves, soon had her fullycharged. He laid her on the ground potential, raised her frequency and loweredher resistance.He pulled out his high voltage probe and inserted it into her socket, connectingthem in parallel, and began to short circuit her resistance shunt; fully excited,Milli-Amp mumbled, "Ohm, Ohm, Ohm".With his tube operating at maximum, and her field oscillating, his current flowcaused her shunt to overheat and Micro-Farad was rapidly discharging,drawing off every electron.They fluxed all night trying various connections and sockets until his magnethad soft core and lost all its field strength.Afterwards, Milli-Amp tried self-inductance and damaged her solenoids. Withher battery discharged, Micro-Farad was unable to excite her field, so they spentthe rest of the night reversing polarity and blowing each other’s fuses.